-- The multipoint_test table is created with the gid smallint column
-- that uniquely identifies the row and the mpt1 ST_MultiPoint column.

CREATE TABLE multipoint_test (gid  smallint,
                              mpt1 ST_MultiPoint);

-- The INSERT statement inserts a multipoint into
-- the mpt1 column using the ST_MPointFromText function.

INSERT INTO multipoint_test VALUES(
    1,
    ST_MPointFromText('multipoint(10.01 20.03,10.52 40.11,30.29 41.56,31.78 10.74)',1000)
);
